VESA Display Power Management (DPMS)
VESA ディスプレイ パワー マネージメント (DPMS)

VESA DPMS機能をサポートしているモニターをお使いになっていれば、モニターの消費電力を 3 段階に切り替えて自動的にシャットダウンする DPMS スクリーン セーバーを利用することができます。自動シャットダウンは、キーボードとマウスが一定時間 (変更できます) 使われなくなった場合にのみ行われます。マウスを動かすかキーボードのキー (Ctrl、Alt、Shift キーなども含まれます) を押すとモニターは元に戻ります。

シャットダウンには次の 3 つの種類があります: スタンバイ、サスペンド、オフ。各モニター製造会社では、モニターのこれらの状態の意味を定義しています。たとえば、平面パネル ディスプレイでは、スタンバイ状態でバックライトを消します。しかし、すべてのケースで、通常の "オン" の状態から、スタンバイ、サスペンド、オフとなるにつれて、モニターの消費電力は少なくなります。詳しくは、お使いになっているモニターのマニュアルをご覧ください。

スクリーン セーバーのオプション

DPMS 無効 (ブランク スクリーン)

DPMS 有効 (スタンバイ状態)

このラジオ ボタンは、スクリーン セーバーが最初に作動したときに何が起こるかを選択します。"DPMS 無効" を選択すると、デフォルトのスクリーン セーバー を選択した状態と同じになります。"DPMS 有効" を選択すると、モニターはスタンバイ状態に移行して、(オプションが選択されている場合) 一定時間マウスやキーボードが使われないとサスペンドやオフの状態に移行します。

"DPMS 有効" を選択した場合でも、ディスプレイ ドライバまたはグラフィック カードが DPMS をサポートしていない場合は、スクリーン セーバーは "DPMS 無効" が選択されたものとみなします。

注意: DPMS をサポートしていないモニターでパワーセーブ モードに切り替えると、モニターに損傷を与える場合があります。モニターが DPMS 機能をサポートしていない場合は、"DPMS 無効" を選択するか、他のスクリーン セーバーをご利用ください。

サスペンド状態に移行する xx 分後

このオプションが選択されていて、マウスとキーボードが一定時間 (単位は分で、範囲は 1 から 99) 使われないと、モニターはサスペンド状態に移行します。この指定時間は、マウスまたはキーボードが使われなくなったときからではなく、スクリーン セーバーが作動したときから計算されます。このオプションが選択されていない場合、次のオプションに応じて、サスペンド状態に移行しないでオフに移行するか、またはスタンバイ状態のままになります。

電源オフ状態に移行する yy 分後

このオプションが選択されていて、マウスとキーボードが一定時間 (単位は分で、範囲は 1 から 99) 使われないと、モニターはサスペンド状態に移行します。この指定時間は、マウスまたはキーボードが使われなくなったときからではなく、モニターがサスペンド状態に移行したとき ("サスペンド状態に移行する" オプションが選択されていない場合はスクリーン セーバーが作動したとき) から計算されます。このオプションが選択されていない場合、前のオプションに応じて、サスペンド状態またはスタンバイ状態のままになります。


デフォルトのスクリーン セーバー

画面上で絵を動かすのではなく、画面を黒く塗りつぶすスクリーン セーバー。Windows NT に標準で含まれていて、コントロール パネルの [画面のデザインの設定] にある "スクリーン セーバー" リストで "スクリーン セーバー" という名前で表示されます。


ディスプレイ ドライバ

Windows NT のモード スイッチを翻訳してグラフィック カードが理解できる様式でコマンドを記述するハードウェア用のプログラム。


DPMS

ディスプレイ パワー マネージメント シグナル (Display Power Management Signalling) の略。ビデオ モニターの消費電力を少なくするための業界標準規格です。


グラフィック カード

モニターを制御するためにコンピュータで使われているカード (またはボード)。カードにより、その能力は異なります。グラフィック アクセラレータは、Windows のようなグラフィカルな環境の描画速度を速くするように設計されています。


VESA

Video Electronics Standards Association の略。DPMS 規格を採用しています。