S3 감마 도움말

도움말 사용법을 보려면 F1을 누르십시오.   저작권


spline 디스플레이는 적색, 녹색 및 청색 감마 spline이 표시되는 곳입니다.  이것은 사용자의 감마가 어떻게 조정될지를 대략적으로 보여주는 곡선입니다.  일반적으로, 모서리에서 모서리까지의 직선은 1.00 감마 또는 조정이 없음을 의미합니다.  45도 이상의 호를 그리는 곡선은 spline의 색상이 보통 밝기보다 밝아지도록 조정됨을 의미합니다.  45도 이하의 곡선은 조정된 색상이 보통 밝기보다 어두워짐을 의미합니다.


적색 요소에 대한 감마 값을 조정하려면 적색 슬라이더를 이동하십시오.  적색 슬라이더를 오른쪽으로 이동할수록 감마 값은 더 높아지며 더 밝은 적색이 됩니다.  적색 슬라이더를 왼쪽으로 이동할수록, 감마 값은 더 낮아지며 더 어두운 적색이 됩니다.


적색 요소에 대한 감마 조정을 변경하려면, 이 영역에 0.20에서 3.00 사이의 값을 입력합니다.  값이 높을수록 더 밝은 적색이 되며, 값이 낮을수록 더 어두운 적색이 됩니다.


녹색 요소에 대한 감마 값을 조정하려면 녹색 슬라이더를 이동하십시오.  녹색 슬라이더를 오른쪽으로 이동할수록 감마 값은 더 높아지며 더 밝은 녹색이 됩니다.  녹색 슬라이더를 왼쪽으로 이동할수록, 감마 값은 더 낮아지며 더 어두운 녹색이 됩니다.


녹색 요소에 대한 감마 조정을 변경하려면, 이 영역에 0.20에서 3.00 사이의 값을 입력합니다.  값이 높을수록 더 밝은 녹색이 되며, 값이 낮을수록 더 어두운 녹색이 됩니다.


청색 요소에 대한 감마 값을 조정하려면 청색 슬라이더를 이동하십시오.  청색 슬라이더를 오른쪽으로 이동할수록 감마 값은 더 높아지며 더 밝은 청색이 됩니다.  청색 슬라이더를 왼쪽으로 이동할수록, 감마 값은 더 낮아지며 더 어두운 청색이 됩니다.


청색 요소에 대한 감마 조정을 변경하려면, 이 영역에 0.20에서 3.00 사이의 값을 입력합니다.  값이 높을수록 더 밝은 청색이 되며, 값이 낮을수록 더 어두운 청색이 됩니다.


이 확인란에서는 적색, 녹색 및 청색 감마를 서로 연결할지 여부를 결정합니다.  이 확인란을 선택하면, 감마 요소가 연결되어 3개의 감마는 항상 동일하게 됩니다.  이 확인란을 선택하지 않으면, 감마 조정은 각각 독립적으로 변경됩니다.


이 버튼을 사용하면 모든 감마 조정이 1.00으로 복구되며 연결 확인란에 체크 표시가 됩니다.  이것은 기본 설정이며, 기본 설정으로 하면 감마 조정이 비디오 출력에 적용되지 않습니다.


이 버튼을 클릭하여 현재 감마 설정을 저장합니다.  사용자가 입력한 이름은 설정을 복구할 때 쉽게 선택할 수 있도록 스킴 목록에 나타납니다.


스킴 상자에서 선택한 스킴을 삭제합니다.


S3 감마는 S3 그래픽 칩의 출력에 대한 감마를 조정할 수 있는 유틸리티입니다.  쉽게 말해 감마는 밝기 조절과 유사합니다.


시스템에 적용될 감마 조정을 변경하기 위해 사용할 수 있는 스킴을 나열합니다.  스킴은 적색, 녹색, 청색 에 대한 감마 조정과 이 3개의 요소가 서로 연결되어 있는지 여부를 저장합니다.


현재 감마 설정의 이름을 입력할 위치를 제공합니다.  사용자가 입력한 이름은 나중에 이들 설정을 쉽게 복구할 수 있도록 스킴 목록에 나타납니다.


이 옵션을 선택하면 디스플레이 1에 설정을 적용합니다.


이 옵션을 선택하면 디스플레이 2에 설정을 적용합니다.


저작권 통지

S3, S3 On Board, 및 Trio3D는 S3 사의 등록 상표입니다.