S3Gamma-ohje

Saat lisätietoja ohjeen käytöstä painamalla F1-näppäintä.   Copyright


Spline-näytössä näkyy punainen, vihreä ja sininen spline-käyrä. Nämä ovat käyriä, jotka antavat karkean kuvan siitä, kuinka gamma-arvoja säädetään. Yleisesti ottaen, suora viiva kulmasta kulmaan tarkoittaa gamma-arvoa 1.00 tai ei säätöä. Käyrä, joka kaareutuu 45 asteen suoran yläpuolella, tarkoittaa, että gamma-arvoa säädetään niin, että spline-käyrää vastaava väri on normaalia kirkkaampi. 45 asteen suoran alapuolelle kaareutuva käyrä tarkoittaa, että säädetty väri on tavallista himmeämpi.


Säädä punaisten värien gamma-arvoa siirtämällä punaista liukusäädintä. Mitä kauemmas oikealle siirrät liukusäädintä, sitä suurempi gamma-arvo ja sitä kirkkaampia punaiset värit ovat. Mitä kauemmas vasemmalle siirrät liukusäädintä, sitä himmeämpiä punaiset värit ovat.


Muuta punaisten värien gammasäätöä antamalla tähän kohtaan välillä 0.20–3.00 oleva arvo. Mitä suurempi arvo, sitä kirkkaammat punaiset värit ja vastaavasti mitä pienempi arvo, sitä himmeämpiä punaiset värit ovat.


Säädä vihreiden värien gamma-arvoa siirtämällä vihreää liukusäädintä. Mitä kauemmas oikealle siirrät liukusäädintä, sitä suurempi gamma-arvo ja sitä kirkkaampia vihreät värit ovat. Mitä kauemmas vasemmalle siirrät liukusäädintä, sitä himmeämpiä vihreät värit ovat.


Muuta vihreiden värien gammasäätöä antamalla tähän kohtaan välillä 0.20–3.00 oleva arvo. Mitä suurempi arvo, sitä kirkkaammat vihreät värit ja vastaavasti mitä pienempi arvo, sitä himmeämpiä vihreät värit ovat.


Säädä sinisten värien gamma-arvoa siirtämällä sinistä liukusäädintä. Mitä kauemmas oikealle siirrät liukusäädintä, sitä suurempi gamma-arvo ja sitä kirkkaampia siniset värit ovat. Mitä kauemmas vasemmalle siirrät liukusäädintä, sitä himmeämpiä siniset värit ovat.


Muuta sinisten värien gammasäätöä antamalla tähän kohtaan välillä 0.20–3.00 oleva arvo. Mitä suurempi arvo, sitä kirkkaammat siniset värit ja vastaavasti mitä pienempi arvo, sitä himmeämpiä siniset värit ovat.


Tällä valintaruudulla määrätään se, onko punainen, vihreä ja sininen gammasäätö liitetty yhteen. Jos valintaruutu on valittuna, gammasäädöt on liitetty yhteen, jolloin kaikki kolme gamma-arvoa ovat aina samoja. Jos valintaruutu ei ole valittuna, gamma-arvoja voidaan säätää toisistaan riippumatta.


Tätä painiketta napsauttamalla voit palauttaa kaikki gammasäädöt arvoon 1.00 ja valita Liitä punainen, vihreä ja sininen -valintaruudun. Tämä on oletusasetus, joka ei tee gammasäätöjä lähtevään näyttösignaaliin.


Tallenna nykyiset gamma-asetukset napsauttamalla tätä painiketta. Antamasi nimi tulee näkyviin Valikoimat-luetteloon, joten voit valita sen helposti ja palauttaa asetukset niin halutessasi.


Poistaa valikoiman, joka on valittuna Valikoimat-ruudussa.


S3 Gamma on apuohjelma, jonka avulla voit säätää S3-grafiikkapiirin lähtösignaalin gamma-arvoa. Gamma on yksinkertaisesti ilmaistuna kirkkaudensäätö.


Luettelee valikoimat, joita voit käyttää järjestelmääsi vaikuttavien gammasäätöjen muuttamiseen. Valikoima tallentaa punaisen, vihreän ja sinisen gammasäädön sekä sen, onko ne liitetty yhteen.


Tarjoaa kohdan, johon voit kirjoittaa nimen nykyisille gamma-asetuksillesi. Kirjoittamasi nimi näkyy Valikoima-luettelossa, jotta pystyt helposti palauttamaan nämä asetukset myöhemmin.


Käytä asetuksia näytössä 1.


Käytä asetuksia näytössä 2.


Copyright-ilmoitus

S3, S3 On Board ja Trio3D ovat S3 Incorporated -yhtiön tavaramerkkejä.